Call for participation - PE2001

                                                          19. April 2001, University of the German Federal Armed Forces Munich

                                                        2

                                                                   nd
                                                                                     GI-Workshop Performance Engineering w ithin the

Softw are D e velopment

S
         COPE

One of the most critical non-functional

quality factors of a software s ystem is the

performance characteristic. The main idea

of performance engineering is to consider

the performance as a design target throug h -

out the whole software development pro c -

ess and especially in its earl y phases. The

goal of the PE2001 workshop is to bring

together experts from industries and r e -

search within the field of performance- and

software-engineering.

P
          RELIMINARY WORHSHOP PROGRAM

M. Christiansen, H. Herting, E.  Rohde:

                         Overview and compatibility of the

                         tools Strategizer - Best/1 - s_aturn

                         within the software performance

                         e n gineering

J. Luethi, C. M . Llado:

                         Sensitivity Analysis of an EJB

                         Performance Model using Interval

                         Parameters

R. Gerlich, R. Gerlich:

                         Performance and Robustness E n -

                         gineering: A Potential Co n flict

H. Eckardt:

                         Bottleneck-analysis ˘ a analytical

                         method for the performance a s -

                         ses s ment

E. Dimitrov, A. Schmietendorf,

K.  T.  Atanassov:

                         Generalised Nets models for the

                         performance analysis of multi-tier

                         client/server systems

D. Stoll, P. Rauch, C. Janczewski,

E.  Lipper:

                         Evaluating Architecture and D e -

                         sign Issues via Performance Mo d -

                         elling: A Case Study

R. Dumke, C. Wille:

                         Performance engineering methods

                         of agent-based software-systems

A. Schmietendorf, R. Ho p fer:

Overview to the use of benc h -

marks within the performance

evaluation of hard- and software-

systems

H. Ultsch:

Web-Performance-Measurement

with � HowAreY ou^ (product

present a tion)

P
ROGRAM COMMITTEE

Prof. Dr. R. Dumke

Otto-von-Guericke-Universität Magdeburg

Dipl. Ing. Dipl. Inform. A. Schmietendorf

T-Nova, EZ Berlin

Prof. Dr. R. Hopfer

HS für Technik und Wirtschaft Dresden

Prof. Dr. F. Lehma nn

Universität der Bu n deswehr München

Prof. Dr. C. Rautenstrauch

Otto-von-Guericke-Universität Magd e burg

Dipl. Ing. H. Herting

DeTeCSM, Be n chmarklabor Darmstadt

Dipl. Inform. A. Scholz

Accenture Unte r nehmensberatung

Prof. Dr. F. Victor

Fachhochschule Köln

O
RGANISATION

The workshop will be held at the university

of the German Federal Armed Forces in

Munich. The workshop language will be

German. Further information about the

registration procedure can be found at the

fo l lowing web-side: http://www-wi.cs.uni-

magdeburg.de/pe2001/

S
UPPORTED BY

GI-FG  2.1.10: Software Measurement

GI-FG  3.2.1: MMB

GI-FB  5: Econom y computer science